\documentclass[]{jsbook}
\usepackage{psfrag,graphicx,color,defvar2,eclepsf,othermac}
\pagestyle{empty}
\begin{document}
%\begin{figure}
\centering
\resizebox{0.7\figbasewidth}{!}{\input{eps-si/Pm080-TdoD65-UlV19-Vt-ts0}}
\par
\resizebox{0.7\figbasewidth}{!}{\input{eps-si/Pm080-TdoD65-UlV19-Pe-ts0}}
\vspace{1zh}

$\UlV = 1.9$ p.u.
\end{document}
