\documentclass[]{jsbook}
\usepackage{psfrag,graphicx,color,defvar2,eclepsf,othermac}
\pagestyle{empty}
\begin{document}
\centering
\epsfile[
\epsfat(40mm,-6mm){$\Vt_1$\pu }
\epsfat(-15mm,45mm){\parbox{2.5em}{\centering$\Vt_2$\\ \pu }}
]{file=eps-si/Pm080-TdoD50-Vt.eps,width=0.3\textwidth}

\bigskip

\resizebox{0.85\figbasewidth}{!}{\input{eps-si/bifu6002-1}}
\end{document}
